         180           8
   4.09469341102001        3.98352166054963        3.80628930354025     
   3.67233075423968        3.53886860764469        3.39512375613102     
   3.36116789145372        3.11143055222229     
  -32.6017479683325       -32.4400855862795       -32.2119427146705     
  -31.9489238147436       -31.5533825231703       -31.2055511745439     
  -30.9846708642724       -30.5592242432381     
 -2.945306527791729E-003  0.000000000000000E+000
  0.992131755420680       0.000000000000000E+000
  0.995260927525196       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
