         180           3
   14.7077110006027        12.9319995914472        10.9644403435046     
   1.14241482440234        1.59879323302549        2.22728502398390     
 -3.290666318591087E-003  0.000000000000000E+000
   1.00239300621970       0.000000000000000E+000
  0.998120893926573       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
