         180           8
   3.97302848105140        3.54700995482586        3.25142889464410     
   2.94768207734290        2.67458851184425        2.48823515800685     
   2.33663682741268        2.23914480227590     
  -35.1990923045894       -35.4676166396301       -35.6642055450734     
  -35.9320593752777       -36.1948391370038       -36.3055343268454     
  -36.5175716922852       -36.6814603675234     
 -3.294392784820519E-003  0.000000000000000E+000
  0.992544082931738       0.000000000000000E+000
  0.995878856939392       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
