         180           8
   4.07063518530802        3.64268858230484        3.25903728494415     
   2.88081922769866        2.55184488737375        2.29590309196693     
   2.14769419031491        2.06671882450027     
  -33.7908607552649       -34.7725755509554       -35.7430344446375     
  -36.4402673076355       -36.9058008146910       -37.3188068632144     
  -37.6908087205204       -37.9752761246893     
 -3.227896407040805E-003  0.000000000000000E+000
  0.992426144770601       0.000000000000000E+000
  0.995769771081571       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
