         180           8
   3.99820835283551        3.59342870463484        3.26835215401504     
   2.84904285747150        2.51155263013457        2.36262104677367     
   2.26415007563716        2.34233734793981     
  -35.4642115950833       -35.7421598605744       -36.0375515356122     
  -36.7296042707593       -37.3954242898478       -37.7341623895701     
  -38.0851353489328       -38.4009007517362     
 -3.294749528005957E-003  0.000000000000000E+000
  0.992579980365135       0.000000000000000E+000
  0.995742285648728       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
