         180           8
   4.98139117469102        4.81875993600770        4.63330396680526     
   4.50586611061202        4.40015313298031        4.29327235840762     
   4.28144555830886        4.16189318859660     
  -35.2605977845236       -34.9665525010787       -34.7430642919361     
  -34.4025525012808       -34.0036634699485       -33.6573666176035     
  -33.3563550264584       -32.9318499106819     
 -3.340569517781514E-003  0.000000000000000E+000
  0.992342899250510       0.000000000000000E+000
  0.995416789563801       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
