         180           8
   4.79371641077701        4.68987477850761        4.53780242677636     
   4.42951314186410        4.30120984654274        4.19154692856070     
   4.15442796317648        4.05101403168833     
  -35.2121228015113       -34.8672636519539       -34.5851904256628     
  -34.2596732255916       -33.9524934201130       -33.6333698198541     
  -33.2858843356562       -33.0131567376449     
 -3.125227618263678E-003  0.000000000000000E+000
  0.992559249309190       0.000000000000000E+000
  0.995013586723439       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
