         180           8
   4.72558335342449        4.52194166240552        4.42280415933817     
   4.33713239272676        4.22337189388378        4.13642732151047     
   4.09435792200271        4.01090657685517     
  -35.2013878133058       -35.0978221821391       -34.8006855066980     
  -34.3806035449726       -34.0336834489904       -33.6848042761922     
  -33.2780751196206       -32.8556681939883     
 -3.424060652444137E-003  0.000000000000000E+000
  0.992563039205503       0.000000000000000E+000
  0.995540489540076       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
