         180           8
   3.53986512725773        3.15669036650855        2.84785239375959     
   2.53845223924546        2.23685912936189        2.05317555641166     
   1.96633903303967        2.13404013577548     
  -35.6208308112801       -35.8268132308704       -36.0671764573092     
  -36.2744852250889       -36.4552220078384       -36.6446003233619     
  -36.8774969859108       -37.6515215534171     
 -3.183532619026288E-003  0.000000000000000E+000
  0.992172063784629       0.000000000000000E+000
  0.995153483131004       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
