         180           8
   3.61710785409627        3.16114347699573        2.75117990170327     
   2.40322586603737        2.11627033931642        1.95630076527287     
   1.87496587197462        1.97923615946901     
  -35.9710808231745       -36.3493861341281       -36.5897864336358     
  -36.8176334044654       -36.9993846411038       -37.1946676387926     
  -37.3707975753073       -38.0458239786537     
 -3.309174410381584E-003  0.000000000000000E+000
  0.992299182301381       0.000000000000000E+000
  0.995230984660452       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
