         180           8
   4.07189826425756        3.74577394407338        3.38474973006678     
   3.01756349665499        2.69163464210283        2.49678457891982     
   2.42868480576988        2.43937598941970     
  -36.4831268427516       -36.7624453521058       -37.0057862486422     
  -37.3094010042085       -37.5536098935890       -37.8153525027329     
  -38.1270181079140       -38.4783126694755     
 -3.255769125756312E-003  0.000000000000000E+000
  0.992277868043026       0.000000000000000E+000
  0.995357400278746       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
