         180           8
   4.09643131469701        3.69465454673549        3.37396077103790     
   3.00798830824375        2.72064672511919        2.53476031158821     
   2.42233042036927        2.41152409505084     
  -36.5190528625382       -36.8600615424837       -37.1675375764264     
  -37.4020164509721       -37.6329000122151       -37.8934782970589     
  -38.1614029926082       -38.6000002262254     
 -3.330942605796377E-003  0.000000000000000E+000
  0.992340240117612       0.000000000000000E+000
  0.995480613785868       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
