         180           8
   4.09384843516793        3.66626759051980        3.35282682468893     
   3.02167074557549        2.74168279314184        2.52409647851852     
   2.35319951007193        2.35613553347899     
  -37.0168855259078       -37.1804545923582       -37.4085500033919     
  -37.6101971373830       -37.8172111101535       -38.0456125099055     
  -38.3534617925248       -38.8582270774650     
 -2.840544109876921E-003  0.000000000000000E+000
  0.993217849191959       0.000000000000000E+000
  0.994257523963951       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
