         180           8
  -33.5361181669447      -0.326632968246691        3.20482720890747     
   2.40217235764951        2.02877454660240        1.94533094593855     
   1.91270210397534        1.94481149752049     
   32.7560569477763       -31.9240228706346       -36.0739976080023     
  -37.0861381729356       -38.1178989608235       -38.1376445402525     
  -38.4908024665750       -38.7896705102002     
 -3.344726853915994E-003  0.000000000000000E+000
  0.992624928861916       0.000000000000000E+000
  0.995407983342516       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
