         180           3
   6.74703007670923        8.34963785423264        10.4079834022178     
  -1.38123699071395      -0.933694218907670      -9.842960134250843E-002
 -2.943715981703264E-003  0.000000000000000E+000
   1.00164126220192       0.000000000000000E+000
  0.998244623322760       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
