         180           8
   8.86132350403936        8.40511526402665        5.65465408422630     
   4.89064462706900        4.81643929770905        4.73378425422806     
   4.64393325404506        4.53833999617579     
   6.74503653445436       -18.5338206154505       -33.1737686568678     
  -35.2922628918049       -34.7704096582496       -34.5540073039625     
  -33.9892277640116       -33.3894926727866     
 -3.625979800078086E-003  0.000000000000000E+000
  0.992541289527361       0.000000000000000E+000
  0.995600485473055       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
