         180           8
  -16.4754017765920        4.71431082987930        5.07349050655014     
   4.96817395608052        4.86297543109160        4.65143297894146     
   4.70754803747763        4.64286692955301     
  -15.4912453776798       -34.6959396781228       -35.4705843362404     
  -35.1896304170108       -34.9542308964140       -34.5545761185981     
  -34.1683833723125       -33.7330962221417     
 -3.731034319325602E-003  0.000000000000000E+000
  0.992634585292463       0.000000000000000E+000
  0.995784043206252       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
