         180           8
   5.88259714111502        5.67024084867504        5.55806348722838     
   5.35053227630145        5.06486342700048        4.92149237528478     
   4.78600152940161        4.74594234997414     
  -35.5709578535727       -35.4968218286019       -35.2677363420507     
  -34.9512755490302       -34.7093237424733       -34.4668352418506     
  -34.0875479295876       -33.6803952699667     
 -3.921763212703284E-003  0.000000000000000E+000
  0.992849971916122       0.000000000000000E+000
  0.996231148355324       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
