         180           8
   5.30967520501137        6.39348046622104        5.95679650111259     
   5.96065482376593        5.76472748989320        5.62038907866773     
   5.59727688666585        5.58056618055838     
   8.83160387783155       -33.2738016900977       -35.6783278078410     
  -35.1732557247340       -34.9306937491318       -34.5242033026445     
  -34.3386212000915       -33.8111741104280     
 -3.523962560825641E-003  0.000000000000000E+000
  0.993098913975761       0.000000000000000E+000
  0.994694030227085       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
