         180           8
   8.50911518745707        7.88465273350050        7.26889950582808     
   6.59463854414688        5.99965212385141        5.44534070994687     
   4.86871392229202        4.38943592911807     
  -30.9989273393061       -31.1041870510337       -31.1506431020785     
  -31.2681571595357       -31.5187850999084       -31.7426681719407     
  -31.9757149296291       -32.1445319098860     
 -3.881141280821425E-003  0.000000000000000E+000
  0.992833978018114       0.000000000000000E+000
  0.995766548206417       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
