         180           8
   8.75293004121517        8.18980451518874        7.56438530904977     
   6.94524727260460        6.34012200102881        5.77572366560606     
   5.25042109812908        4.75334980391846     
  -31.0881198302635       -31.1285601303526       -31.2235337519649     
  -31.3427354701874       -31.5488245084966       -31.7748469652539     
  -32.0291356226567       -32.2902097004400     
 -3.858060192674935E-003  0.000000000000000E+000
  0.992436154060288       0.000000000000000E+000
  0.995619485231145       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
