         180           3
   14.6013972507314        12.5009241297846        10.4007936390734     
  9.986153864191680E-002  0.717218796184399        1.07709967538297     
 -2.839709551607584E-003  0.000000000000000E+000
   1.00198963731673       0.000000000000000E+000
  0.998850006825461       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
