         180           8
   8.68847121751851        8.15039720654208        7.53078550524826     
   6.90592890279395        6.27650352750251        5.68595571622010     
   5.11461508814548        4.57091309470941     
  -30.9975795283277       -31.0744562371880       -31.1443446633939     
  -31.2649070063595       -31.4850107190573       -31.7576713651501     
  -32.0063114056678       -32.2761851890448     
 -3.875351927069397E-003  0.000000000000000E+000
  0.992534104028114       0.000000000000000E+000
  0.995883614925722       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
