         180           3
   14.3524904771553        12.3520003375855        10.3021174728249     
 -0.488373070655819       0.423686771911049       0.776977631156741     
 -2.832159540380968E-003  0.000000000000000E+000
   1.00189782416884       0.000000000000000E+000
  0.998918979961537       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
