         180           8
   8.47129875861679        7.98329997468340        7.34394675923442     
   6.73165606546211        6.12861855376198        5.52303277203008     
   4.95734629645863        4.41146279285860     
  -31.4883273095525       -31.3971828599530       -31.4267884718085     
  -31.4863693574737       -31.6830674297497       -31.8953514704030     
  -32.1221759129639       -32.5227029432812     
 -3.968564952773590E-003  0.000000000000000E+000
  0.992749739321411       0.000000000000000E+000
  0.996014505788491       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
