         180           8
   8.41864156080641        7.72199918098461        7.13027002574307     
   6.51331049877993        5.90797651146702        5.31765439035190     
   4.74815877557390        4.22413531958899     
  -31.0937543456991       -31.1557634958898       -31.2418553927243     
  -31.3360968242709       -31.5083106020992       -31.7731371130327     
  -32.0315135203847       -32.2837197393707     
 -3.808958539901379E-003  0.000000000000000E+000
  0.992555618134097       0.000000000000000E+000
  0.995642025357487       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
