         180           8
   8.55939692844269        7.80077404820639        7.21381378226291     
   6.60843053083386        6.00285076622685        5.42996154214374     
   4.87853084870650        4.41291234165185     
  -31.0773166745144       -31.1623463459034       -31.2588491363918     
  -31.4066982085433       -31.6172034034662       -31.9059230042876     
  -32.1963789081854       -32.5905074604683     
 -3.858181309665625E-003  0.000000000000000E+000
  0.992825907628469       0.000000000000000E+000
  0.996002680254076       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
