         180           8
   8.45076518698810        7.95683545173872        7.36711147538993     
   6.70897120004184        6.08478201190726        5.54966805372861     
   4.96361779396703        4.43191811683054     
  -27.0987743746106       -26.8623833068009       -26.5511100687964     
  -26.3336913567154       -26.1781369910804       -26.0472806275695     
  -25.9738290555128       -26.0778037733901     
 -3.759334238520404E-003  0.000000000000000E+000
  0.992702765981222       0.000000000000000E+000
  0.995642931869907       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
