         180           3
   14.9107392606137        12.6261018167542        10.2170648826528     
   1.08872801211772        4.33271616053267        6.99103001861511     
 -2.895248188833360E-003  0.000000000000000E+000
   1.00174929492316       0.000000000000000E+000
  0.998491590284509       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
