         180           8
   8.43520196168860        7.82790300902417        7.22141057770116     
   6.56083434098611        5.96255663296119        5.37079474391675     
   4.83413558219042        4.21433008645880     
  -31.0278666176292       -30.3432613856933       -29.9665702526610     
  -29.6616350206962       -29.3827659927303       -29.1687003108908     
  -29.0284962654094       -28.8547430949720     
 -3.796733174963620E-003  0.000000000000000E+000
  0.992668733012513       0.000000000000000E+000
  0.995555690002602       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
