         180           8
   8.49550693093575        7.91496341093663        7.31251575553161     
   6.70452861532078        6.13466395681027        5.57118561128195     
   4.97572248706199        4.42083324756161     
  -31.0845858960427       -31.0938527904531       -31.1795089175198     
  -31.3029064604572       -31.5074445195821       -31.7394054157728     
  -31.9970522210742       -32.2415611975317     
 -3.815041715310881E-003  0.000000000000000E+000
  0.992560248163293       0.000000000000000E+000
  0.995691242061088       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
