         180           3
   14.7648895361401        12.6967114835818        10.6196877736446     
 -0.620835041865477       0.196857175564037       0.634670394518428     
 -2.834055282821618E-003  0.000000000000000E+000
   1.00173784437557       0.000000000000000E+000
  0.998647877672555       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
