         180           8
   8.75907511047798        8.07711247877488        7.42226255404367     
   6.78046451286282        6.15523891405364        5.56380659694443     
   5.00895771904578        4.42989537829969     
  -28.2183745811295       -27.8590995001711       -27.5447772845783     
  -27.2993509470501       -27.1093986340010       -26.9659852718282     
  -26.8843908661785       -26.8211724055641     
 -3.864100483933762E-003  0.000000000000000E+000
  0.992712890829668       0.000000000000000E+000
  0.995795048291323       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
