         180           8
   8.79102407708753        8.09340525054979        7.52649044217076     
   6.91517140843791        6.33046581698051        5.77280101033632     
   5.18863319221055        4.67984631920898     
  -30.9220982465801       -30.9955586928572       -31.0694848160608     
  -30.9043622240869       -30.5414522243197       -30.2871780664375     
  -30.1542687784614       -30.0310019395810     
 -3.842618912268106E-003  0.000000000000000E+000
  0.992711354377015       0.000000000000000E+000
  0.995599707636857       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
