         180           8
   8.67132700942984        7.97576283160605        7.36137877144134     
   6.73896306741734        6.15539156018986        5.58392780784187     
   5.04467712535320        4.44828202448185     
  -31.1465106951203       -31.1991399956677       -31.2641948683721     
  -31.3956357295704       -31.6076731350551       -31.8791936682490     
  -32.1795387214923       -32.4733194263856     
 -3.805052515711785E-003  0.000000000000000E+000
  0.992827220525210       0.000000000000000E+000
  0.996031664613051       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
