         180           8
   14.4227651128319        13.8245832951613        13.1493371929543     
   12.4784631534709        11.8068394954542        11.1491540098807     
   10.4728095956945        10.0460490653532     
   4.99908187865577        5.86821567446301        6.65817028634517     
   7.37106646539878        8.14897711190128        8.94539950949570     
   9.50319611574347        10.2091968932316     
 -2.863232007754012E-003  0.000000000000000E+000
   1.00169389738444       0.000000000000000E+000
  0.999072238466349       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
