         180           8
   8.71875437532728        8.06585193099632        7.41007585725079     
   6.77455719663096        6.14467752691872        5.55329603729664     
   4.98925892617617        4.38828023719635     
  -28.1970177541530       -27.8584595717400       -27.5355721420024     
  -27.2937727491001       -27.0994879847038       -26.9522202578795     
  -26.8811361989056       -26.7842765379037     
 -3.838237507563911E-003  0.000000000000000E+000
  0.992581736063529       0.000000000000000E+000
  0.995707944036297       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
