         180           3
   14.1534365902119        12.0527236334634        9.99062340883472     
 -0.571150269340911      -0.202084081740517       0.837203614410967     
 -3.044268118397183E-003  0.000000000000000E+000
   1.00168407009544       0.000000000000000E+000
  0.998374979311540       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
