         180           8
   7.92086554548332        7.24473836032453        6.58701113261691     
   5.97454810457864        5.42530013731613        4.81529795451696     
   4.26097954074604        3.74386169461984     
  -32.1073064280230       -32.2156852084306       -32.2747057043586     
  -32.3873746708220       -32.6158978998817       -32.8603995625606     
  -33.1154209263429       -33.3854034742223     
 -4.022243363719569E-003  0.000000000000000E+000
  0.992540776849073       0.000000000000000E+000
  0.995478001062318       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
