         180           8
   7.73441759741340        7.20892444424156        6.56475031387871     
   5.91117206597190        5.23514564995461        4.64689364780165     
   4.07204454303913        3.45865132722337     
  -31.6947932539451       -30.9130021627670       -30.4688127345140     
  -31.2510217736230       -32.0337764010192       -32.3945023229724     
  -32.6882222745755       -33.0152935488907     
 -4.112583470473890E-003  0.000000000000000E+000
  0.992854276566337       0.000000000000000E+000
  0.995913126508981       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
