         180           8
   11.4716087814968        10.7393250008318        10.1176695079592     
   9.48488018326965        8.87680304470093        8.33269428685607     
   7.76582066777157        7.25864816394022     
  -33.1057357693599       -33.1225774643530       -33.1903913111622     
  -33.2935364652506       -33.4916332685051       -33.7087477882726     
  -33.8887088851482       -34.2033129205947     
 -4.026039707603898E-003  0.000000000000000E+000
  0.993546404775173       0.000000000000000E+000
  0.995966913650364       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
