         180           8
   11.7373071738475        11.0888107984125        10.4607133022145     
   9.81734020296109        9.15439249834530        8.53852864059933     
   7.93154609824438        7.33926654428933     
  -33.0062246025751       -33.0557234997575       -33.1596706176758     
  -33.2984478395217       -33.4746433783914       -33.6751353654622     
  -33.9617650025506       -34.3765547971306     
 -4.255426588723143E-003  0.000000000000000E+000
  0.993625284941750       0.000000000000000E+000
  0.996418821204110       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
