         180           8
   15.0800300281699        14.3133096823486        13.5975979003141     
   12.8964629245910        12.2356375821124        11.5744722134636     
   10.9710981312290        10.3662078183016     
  -32.0167160778892       -32.8381351719000       -33.2620071573449     
  -33.4855573031091       -33.7084204208606       -33.9137703582922     
  -34.1312921705956       -34.4266161604458     
 -4.176033394123709E-003  0.000000000000000E+000
  0.993658657266217       0.000000000000000E+000
  0.996929451168414       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
