         180           8
  -31.5702349772240       -27.2911136830012       -16.2036504337227     
  -15.3602256400617       -5.90050219339145        15.5404302502984     
   38.1402415317168        59.2222474946086     
   15.3216739762927        11.5333017235979        6.53741150359610     
   10.5775527617071        9.83150409071118       0.992303727421805     
  -10.8309378010737       -28.5556639293713     
 -2.774629257712715E-003  0.000000000000000E+000
  0.991248806632446       0.000000000000000E+000
  0.991289228711223       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
