         180           3
   8.68936019279804        6.55611358981633        4.59165468803121     
   14.2142589511302        14.8653866756744        15.1288764998511     
 -9.493847824809319E-004  0.000000000000000E+000
   1.00206568065334       0.000000000000000E+000
  0.996600361334139       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
