         180           8
   1.46380196861692       0.700792371978678       7.529190640410523E-002
 -0.561403891671827       -1.23221923833810       -1.87427744931526     
  -2.40425486952405       -2.98422349383451     
  -16.9918849955161       -17.0813918960361       -17.3269800477201     
  -17.5353475705023       -17.7104129946199       -17.9303777500888     
  -18.1968904060094       -18.4749832312279     
 -1.698426828519377E-003  0.000000000000000E+000
  0.991856539461522       0.000000000000000E+000
  0.992935156259208       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
