         180           8
   2.22421232713152        1.54006705920142       0.865148208054134     
  0.193629597834009      -0.447102991887116       -1.00057442632904     
  -1.56587252758974       -2.10215415305111     
  -16.8918240448241       -16.8614753056228       -16.9177672959416     
  -17.0420379349959       -17.2886836118042       -17.5332485631995     
  -17.8234193816632       -18.1375393810211     
 -2.027183434868023E-003  0.000000000000000E+000
  0.993225426209308       0.000000000000000E+000
  0.995923112182991       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
