         180           8
   3.20947468815921        2.51870753713252        1.86583860561181     
   1.18891427760084       0.550209059750035      -5.241571217656724E-002
 -0.670364911407942       -1.20431490843207     
  -17.2487389847723       -17.3225431707344       -17.3922662847295     
  -17.5013881223861       -17.6676684989755       -17.9090624634579     
  -18.2355698406408       -18.5341511412409     
 -2.061858050986959E-003  0.000000000000000E+000
  0.992797258687459       0.000000000000000E+000
  0.995322424806776       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
