         180           3
   7.95905943904948        5.79642018452370        3.79309991693230     
   14.2538893158736        14.8816980968931        15.3940643083636     
 -9.332230437892417E-004  0.000000000000000E+000
   1.00199534751761       0.000000000000000E+000
  0.998106949498908       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
