         180           8
   1.60655412091450       0.953289850045439       0.282989623822007     
 -0.353267981303761      -0.933488159581466       -1.53132236673564     
  -2.13622810426553       -2.79016536059753     
  -16.4063988560854       -16.5031327346952       -16.6141667521124     
  -16.7524655643107       -16.9239465720325       -17.1523716916522     
  -17.4909343834032       -17.7585519622490     
 -1.873653905893356E-003  0.000000000000000E+000
  0.992250480947464       0.000000000000000E+000
  0.994340128069743       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
